A solid is made by removing a pyramid from a cuboid.
The cuboid has the dimensions: $H = 12$~cm ; $L = 4$~cm ; $W = 3$~cm.

\begin{minipage}{8cm}
The pyramid is half the height of the cuboid.

\begin{enumerate}
	\item \nbPointsEnumi{3}Calculate the volume of the cuboid.
\end{enumerate}

The formula to compute the volume of a pyramid is given:

$$\dfrac{1}{3} \times \text{Area(base)} \times \text{height}$$

\begin{enumerate}[resume]
	\item \nbPointsEnumi{3}Calculate the volume of the pyramid.
	\item \nbPointsEnumi{2}Calculate the volume of the solid.
\end{enumerate}
\end{minipage}
\quad
\begin{minipage}{6.5cm}
\includegraphics[width=6.5cm]{S5P4/2021_June/2021_06_S5P4_ESRM_EN_BTest_ExoA4_IMG1.jpg}
\end{minipage}
