\noindent\begin{minipage}{10.5cm}
The graph below shows the height above the
ground of a cabin on a Ferris wheel as a function
of time.

The Ferris wheel takes 5 minutes to complete one
full rotation.

The cabin follows a circular path between the
heights of 0~m and 65~m above the ground.
\end{minipage}
\begin{minipage}{4cm}
\includegraphics[width=1.55556in,height=1.70903in]{S6P3/2022_June/2022_06_S6P3_ESK_DE_BTest_ExoA3_IMG1.jpg}
\end{minipage}

\begin{center}
\includegraphics[width=3.03681in,height=1.81528in]{S6P3/2022_June/2022_06_S6P3_ESK_DE_BTest_ExoA3_IMG2.jpg}
\end{center}

\begin{enumerate}
\item
  \nbPointsEnumi{2}\textbf{Determine} the coordinates of points A and B on the graph above.

\item
  \nbPointsEnumi{2}\textbf{Explain} how the graph would change if the Ferris wheel were to take 10
minutes to complete a circuit.

\item
  \nbPointsEnumi{2}\textbf{Describe} any limitations of this model when applied to the practical
situation.
\end{enumerate}
